2 2.1 2.2 2.3 2.4 2.5 0

1

2

3

4

5

6 x 10^{-3} Gitter med 2 - 5 spalter. (a=0.04mm, d=0.125mm)

y (cm)

Normert intensitet

N=2 N=3 N=4 N=5