0 50 100 150 200 250 0

20

40

60

80

100

Hastighetsmåling nr v (cm/s)

Skivenes fart

0 20 40 60 80 100 120 0

0.05

0.1

0.15

v (cm/s)

Andel fartsmålinger

Fordeling for fart v

-100 -50 0 50 100 0 0.05 0.1 0.15 0.2 0.25 v^x (cm/s)

Fordeling for v^x

-100 -50 0 50 100 0 0.05 0.1 0.15 0.2 v^y (cm/s)

Fordeling for v^y

-100 -50 0 50 100 -100 -50

0 50 100 v^x (cm/s) vy (cm/s)

Skivenes hastigheter

-40 -20 0 20 40 -30 -20 -10 0 10 20 30 x (cm) y (cm)

Skivenes posisjoner